;/*****************************************************************************/
;/*                                                                           */
;/*  DDE4MBS.DLL definitions file                                             */
;/*                                                                           */
;/*  Licensed Materials - Property of IBM                                     */
;/*                                                                           */
;/*  IBM C Set/2  Version 1.0                                                 */
;/*  (C) Copyright International Business Machines Corp., 1991,1992           */
;/*  All rights reserved                                                      */
;/*                                                                           */
;/*  US Government Users Restricted Rights -                                  */
;/*  Use, duplication, or disclosure restricted                               */
;/*  by GSA ADP Schedule Contract with IBM Corp.                              */
;/*                                                                           */
;/*****************************************************************************/

LIBRARY CRT TERMINSTANCE
PROTMODE
DATA MULTIPLE NONSHARED READWRITE LOADONCALL
CODE LOADONCALL
STUB 'COPYV1R0.EXE'
EXPORTS
   _PGLOBAL_PTR
   _cputsused
   _critlib_except           ; ****
   _ctype
   _DosSelToFlat             ; ****
   _DosFlatToSel             ; ****
   _environ                  ; ****
   _errno
   _getcheused
   _osmajor
   _osminor
   _osmode
   _timezone
   _tzname
   _ungetchused
   stderr
   stdin
   stdout
   _CRT_init                 ; ****
   _CheckIfMem
   _EXE_Exception            ; ****
   _Exception                ; ****
   _Flush
   _Fmprs
   _Fnprs
   _GetErrMsg
   _InitBuf
   _Lib_excpt
   _PrintErrMsg              ; ****
   _ReleaseSem
   _RequestSem
   __EDC3216
   __EDCThunkProlog
   __dofmto
   __doserrno
   __goscan
   __threadid
   _assert
   _atold
   _beginthread
   _cputs
   _ddused
   _dposqnan
   _ecvt
   _endthread
   _erf
   _erfc
   _exception_dllinit        ; ****
   _exception_procinit       ; ****
   _fcloseall
   _fopenused
   _fposqnan
   _fposinfi
   _fpreset
   _FreeFCB
   _freemod
   _gcvt
   _getche
   _heapmin
   _InitFCB
   _internal_err
   _itoa
   _j0
   _j1
   _jn
   _ldposqnan
   _ldposinfi
   _loadmod
   _ltoa
   _matherr                  ; ****
   _putenv
   _setupenv
   _terminate                ; ****
   _test_handle
; SHL  _tmemory_sem
   _tzset
   _ultoa
   _y0
   _y1
   _yn
   abort
   abs
   asctime
   atexit
   atof
   atoi
   atol
   bsearch
   calloc
   clearerr
   clock
   ctime
   difftime
   exit                      ; ****
   fclose
   feof
   ferror
   fflush
   fgetc
   fgetpos
   fgets
   fopen
   fprintf
   fputc
   fputs
   fread
   free                      ; ****
   freopen
   frexp
   fscanf
   fseek
   fsetpos
   ftell
   fwrite
   getchar
   getenv
   gmtime
   isalnum
   isalpha
   iscntrl
   isdigit
   isgraph
   islower
   isprint
   ispunct
   isspace
   isupper
   isxdigit
   localeconv
   localtime
   malloc                    ; ****
   memccpy
   memchr
   memcmp
   memcpy
   memicmp
   memmove
   memset
   mktime
   perror
   printf
   qsort
   raise
   rand
   realloc
   remove
   rename
   rewind
   scanf
   setbuf
   setvbuf
   signal
   sprintf
   srand
   sscanf
   strcat
   strchr
   strcmp
   strcoll
   strcpy
   strcspn
   strdup                    ; ****
   strerror
   strftime
   stricmp
   strlen
   strlwr
   strncat
   strncmp
   strncpy
   strnicmp
   strpbrk                   ; ****
   strrchr
   strspn
   strstr
   strtod
   strtok
   strtol
   strtold
   strtoul
   strupr
   strxfrm
   system
   tan
   tanh
   time
   tmpfile
   tmpnam
   tolower
   toupper
   ungetc
   vfprintf
   vprintf
   vsprintf
