 
LIBRARY LSWIDGET INITINSTANCE TERMINSTANCE

option description '@#The Netlabs lSwitcher team:2.81#@##1## 2014-07-04 03:22:00      TRESBOPEEP::EN:US:0:U:@@2 lSwitcher Xcenter plugin DLL Copyright (c) 1997-2009 Andrei Los, Copyright (c) 2010, 2014 Netlabs lSwitcher Team All rights reserved'

PROTMODE

DATA    MULTIPLE READWRITE LOADONCALL NONSHARED
;       doesn't really matter, because the widget is only ever used
;       in the WPS process; we use MULTIPLE NONSHARED here to reduce
;       the amount of shared memory that is needed for the DLL

CODE    LOADONCALL

IMPORTS
   LSWHOOK.lswHookInit
   LSWHOOK.lswHookTerm
   LSWHOOK.lswHookGetVersion
   DOSGETPRTY = DOSCALLS.9

EXPORTS
    WgtInitModule      @1
    WgtUnInitModule    @2
    WgtQueryVersion    @3


