; $Id: odincrt.def,v 1.31 2004-03-16 17:24:54 sandervl Exp $
; Odin VAC++ 3.08 shared multithreaded runtime
LIBRARY ODINCRT INITINSTANCE TERMINSTANCE
DESCRIPTION 'Odin32 System DLL - VAC++ 3.08 Release OdinCRT'
DATA MULTIPLE NONSHARED READWRITE LOADONCALL
CODE LOADONCALL
SEGMENTS
   DDE4_DATA32 CLASS 'DATA' NONSHARED READWRITE LOADONCALL
   LIBDATA16   CLASS 'DATA' NONSHARED READWRITE LOADONCALL

; We should have plain forwarders for functions that do
; NOT employ _CrtGetLocalData in any way. Alternatively,
; we could provide corresponding macros for that purpose.

EXPORTS

; -----------------
; memory management
; -----------------
       odin_calloc                           @346    NONAME
       odin_realloc                         @583    NONAME
       odin_malloc                           @351    NONAME
       odin_free                               @219    NONAME
       odin__debug_calloc                 @117    NONAME
       odin__debug_realloc           @182    NONAME
       odin__debug_malloc         @119    NONAME
       odin__debug_free             @59 NONAME
       odin__umalloc                           @749    NONAME
       odin__debug_umalloc                @185    NONAME
       odin__ucalloc                           @704    NONAME
       odin__debug_ucalloc               @181    NONAME

    odin_fread                                             @265  NONAME
    odin_fwrite                                            @430 NONAME
    odin_fopen                                             @293  NONAME
    odin_fputc                                             @305  NONAME
    odin_fputs                                             @311  NONAME
    odin_fsetpos                                           @652    NONAME
    odin_fclose                                            @354 NONAME
    odin_fflush                                            @370 NONAME
    odin_freopen                                           @612    NONAME
    odin_fgetpos                                           @630    NONAME
    odin_vfprintf                                          @755   NONAME
    odin_feof                                              @230   NONAME
    odin_ferror                                            @414 NONAME
    odin_fseek                                             @271  NONAME
    odin_ftell                                             @273  NONAME
    odin_fgetc                                             @262  NONAME
    odin_fgets                                            @267   NONAME
    odin_fgetwc                                            @343 NONAME
    odin_fgetws                                            @369 NONAME
    odin_fputwc                                            @435 NONAME
    odin_fputws                                            @478 NONAME

    odin_fdopen                                           @605 NONAME

    odin_tmpnam                                           @409 NONAME

    __nw__FUiPCcT1                                      @172  NONAME
    __dl__FPvPCcUi                                      @201  NONAME
    __nw__FUi                                           @850  NONAME
    __dl__FPv                                           @839  NONAME

;;    __nw__FUiPv                                       @109  NONAME
;;    __nw__FUiPCcT1Pv                                  @447  NONAME

;;TODO!
    fprintf                                           @647  NONAME

     strdup                                     @472    NONAME
    strncpy                                      @751    NONAME

; original exports
    __ct__8ifstreamFPCciT2                             @1   NONAME
    _dump_allocated_delta                              @2   NONAME
    __ct__8ofstreamFPCciT2                             @3   NONAME
    __ct__9streambufFPciT2                             @4   NONAME
    __ct__9strstreamFPciT2                             @5   NONAME
    _IEEE_LDBL_INF_MASK                                @6   NONAME
    __RestoreRegsAndJump                               @7   NONAME
    init__3iosFP9streambuf                             @8   NONAME
    _exception_procinit                                @9   NONAME
    __ct__3iosFP9streambuf                             @10  NONAME
    __Invoke__Destructor                               @11  NONAME
    underflow__7filebufFv                              @12  NONAME
    __nw__FP8SOMClassUiPv                              @13  NONAME
    __ct__10istrstreamFPCc                             @14  NONAME
    overflow__9streambufFi                             @15  NONAME
    __ct__12strstreambufFi                             @16  NONAME
    __ct__10istrstreamFPci                             @17  NONAME
    __ct__10istrstreamFPSc                             @18  NONAME
    __ct__10istrstreamFPUc                             @19  NONAME
    getline__7istreamFPcic                             @20  NONAME
    __ct__12strstreambufFv                             @21  NONAME
    seekpos__9streambufFli                             @22  NONAME
    __as__19iostream_withassignFR3ios                  @23  NONAME
    __dt__12strstreambufFv                             @24  NONAME
    fill__3iosFc                                       @25  NONAME
    skip__3iosFi                                       @26  NONAME
    seekg__7istreamFlQ2_3ios8seek_dir                  @27  NONAME
    seekp__7ostreamFlQ2_3ios8seek_dir                  @28  NONAME
    setf__3iosFl                                       @29  NONAME
    __ct__3iosFv                                       @30  NONAME
    _getcheused                                        @31  NONAME
    set_terminate__FPFv_v                              @32  NONAME
    __dt__3iosFv                                       @33  NONAME
    pcount__10ostrstreamFv                             @34  NONAME
    pbackfail__8stdiobufFi                             @35  NONAME
    __vec__debug__delete2                              @36  NONAME
    _CheckIfMem                                        @37  NONAME
    _fscanfieee                                        @38  NONAME
    x_snextc__9streambufFv                             @39  NONAME
    _heap_check                                        @40  NONAME
    close__11fstreambaseFv                             @41  NONAME
    _filelength                                        @42  NONAME
    rdbuf__11stdiostreamFv                             @43  NONAME
    _sscanfieee                                        @44  NONAME
    __vec__new2                                        @45  NONAME
    xsgetn__9streambufFPci                             @46  NONAME
    _tdump_allocated_delta                             @47  NONAME
    dec__FR3ios                                        @48  NONAME
    setbuf__9streambufFPci                             @49  NONAME
    _udump_allocated_delta                             @50  NONAME
    _IEEE_DBL_ALL_EXP_MASK                             @51  NONAME
    iconv_close                                        @52  NONAME
    _printfieee                                        @53  NONAME
    _ReleaseSem                                        @54  NONAME
    _beginthread                                       @55  NONAME
    setbase__Fi                                        @56  NONAME
    _strtodieee                                        @57  NONAME
    form__FPCce                                        @58  NONAME
    __dump_allocated_delta                             @60  NONAME
    __CatchMatch                                       @61  NONAME
    localdtconv                                        @62  NONAME
    setfill__Fi                                        @63  NONAME
    set_unexpected__FPFv_v                             @64  NONAME
    _LC_INF_STR                                        @65  NONAME
    _RequestSem                                        @66  NONAME
    _LC_NAN_STR                                        @67  NONAME
    underflow__8stdiobufFv                             @68  NONAME
    nl_langinfo                                        @69  NONAME
    _threadstore                                       @70  NONAME
    _scanf_ansi                                        @71  NONAME
    _ungetchused                                       @72  NONAME
    oct__FR3ios                                        @73  NONAME
    _mb_cur_max                                        @74  NONAME
    _swscanfieee                                       @75  NONAME
    _fprintfieee                                       @76  NONAME
    _PGLOBAL_PTR                                       @77  NONAME
    _test_handle                                       @78  NONAME
    hex__FR3ios                                        @79  NONAME
    __ct__9strstreamFPSciT2                            @80  NONAME
    _debug_tfree                                       @81  NONAME
    _uheap_walk                                        @82  NONAME
    _fscanf_ansi                                       @83  NONAME
    _theap_check                                       @84  NONAME
    __ct__9strstreamFPUciT2                            @85  NONAME
    _uheap_check                                       @86  NONAME
    _sprintfieee                                       @87  NONAME
    _ProfileHookVAOptlink32                            @88  NONAME
    _vprintfieee                                       @89  NONAME
    _execle_ansi                                       @90  NONAME
    __ct__12strstreambufFPFl_PvPFPv_v                  @91  NONAME
    _ctype_mask                                        @92  NONAME
    __heap_check                                       @93  NONAME
    _sscanf_ansi                                       @94  NONAME
    setf__3iosFlT1                                     @95  NONAME
    _execl_ansi                                        @96  NONAME
    _printf_ansi                                       @97  NONAME
    nextbit__3ios                                      @98  NONAME
    _PrintErrMsg                                       @99  NONAME
    __vtt7fstream                                     @100  NONAME
    __vft7istream                                     @101  NONAME
    _execlp_ansi                                      @102  NONAME
    _vfprintfieee                                     @103  NONAME
    _spawnl_ansi                                      @104  NONAME
    __vtt7istream                                     @105  NONAME
    __vft13strstreambase3ios                          @106  NONAME
    seekoff__7filebufFlQ2_3ios8seek_diri              @107  NONAME
    _ctype_upper                                      @108  NONAME
    _ctype_lower                                      @110  NONAME
    __vft7ostream                                     @111  NONAME
    _ctype_cmask                                      @112  NONAME
    __vft7filebuf9streambuf                           @113  NONAME
    __vtt7ostream                                     @114  NONAME
    _DosSelToFlat                                     @115  NONAME
    _DosFlatToSel                                     @116  NONAME
    attach__11fstreambaseFi                           @118  NONAME
    _vsprintfieee                                     @120  NONAME
    __theap_check                                     @121  NONAME
    _j0                                               @122  NONAME
    __uheap_check                                     @123  NONAME
    _j1                                               @124  NONAME
    _swprintfieee                                     @125  NONAME
    __ct__13strstreambaseFv                           @126  NONAME
    __dt__13strstreambaseFv                           @127  NONAME
    verify__11fstreambaseFi                           @128  NONAME
    detach__11fstreambaseFv                           @129  NONAME
    _internal_err                                     @130  NONAME
    _execlpe_ansi                                     @131  NONAME
    _swscanf_ansi                                     @132  NONAME
    _INFINITY_LEN                                     @133  NONAME
    __ct__10istrstreamFPCci                           @134  NONAME
    _spawnle_ansi                                     @135  NONAME
    _fprintf_ansi                                     @136  NONAME
    _spawnlp_ansi                                     @137  NONAME
    _y0                                               @138  NONAME
    flags__3iosFl                                     @139  NONAME
    __ct__10istrstreamFPCSc                           @140  NONAME
    getline__7istreamFPScic                           @141  NONAME
    getline__7istreamFPUcic                           @142  NONAME
    _y1                                               @143  NONAME
    __ct__10istrstreamFPCUc                           @144  NONAME
    __ct__10istrstreamFPSci                           @145  NONAME
    __ct__10istrstreamFPUci                           @146  NONAME
    __ct__13Iostream_initFv                           @147  NONAME
    __ct__8stdiobufFP6__file                          @148  NONAME
    __dt__13Iostream_initFv                           @149  NONAME
    _sprintf_ansi                                     @150  NONAME
    terminate__Fv                                     @151  NONAME
    __vec__copy                                       @152  NONAME
    _ProfileHook32                                    @153  NONAME
    __vft8stdiobuf9streambuf                          @154  NONAME
    _INFINITY_STR                                     @155  NONAME
    _ProfileHook16                                    @156  NONAME
    __ct__11fstreambaseFiPcT1                         @157  NONAME
    __ct__10istrstreamFPCSci                          @158  NONAME
    __ct__10istrstreamFPCUci                          @159  NONAME
    iword__3iosFi                                     @160  NONAME
    nextword__3ios                                    @161  NONAME
    pword__3iosFi                                     @162  NONAME
    __vft7istream3ios_7fstream8iostream               @163  NONAME
    __ct__10ostrstreamFPciT2                          @164  NONAME
    __CleanupCatch                                    @165  NONAME
    WS__FR7istream                                    @166  NONAME
    ws__FR7istream                                    @167  NONAME
    pbackfail__9streambufFi                           @168  NONAME
    __vec__new__place__som                            @169  NONAME
    __vft7ostream3ios_7fstream8iostream               @170  NONAME
    __vft13strstreambase3ios_10istrstream             @171  NONAME
    __vft13strstreambase3ios_10ostrstream             @173  NONAME
    __ct__10ostrstreamFPSciT2                         @174  NONAME
    freeze__12strstreambufFi                          @175  NONAME
    __ct__10ostrstreamFPUciT2                         @176  NONAME
    __vec__assign                                     @177  NONAME
    open__11fstreambaseFPCciT2                        @178  NONAME
    setbuf__11fstreambaseFPci                         @179  NONAME
    _debug_tcalloc                                    @180  NONAME
    doallocate__9streambufFv                          @183  NONAME
    _debug_tmalloc                                    @184  NONAME
    __vtt8ifstream                                    @186  NONAME
    unexpected__Fv                                    @187  NONAME
    xalloc__3iosFv                                    @188  NONAME
    __vtt8iostream                                    @189  NONAME
    pcount__12strstreambufFv                          @190  NONAME
    __ct__11fstreambaseFPCciT2                        @191  NONAME
    log                                               @192  NONAME
    __dl__FP9SOMObjectPCcUi                           @193  NONAME
    _debug_heapmin                                    @194  NONAME
    setbuf__9streambufFPUci                           @195  NONAME
    fabs                                              @196  NONAME
    _vswprintfieee                                    @197  NONAME
    cin                                               @198  NONAME
    tan                                               @199  NONAME
    __vec__delete2                                    @200  NONAME
    labs                                              @202  NONAME
    abs                                               @203  NONAME
    __vtt8ofstream                                    @204  NONAME
    _spawnlpe_ansi                                    @205  NONAME
    rdbuf__13strstreambaseFv                          @206  NONAME
    _mig_eib_store                                    @207  NONAME
    sin                                               @208  NONAME
    xsputn__9streambufFPCci                           @209  NONAME
    atan                                              @210  NONAME
    ceil                                              @211  NONAME
    unsetf__3iosFl                                    @212  NONAME
    _jn                                               @213  NONAME
    __vtt18istream_withassign                         @214  NONAME
    cos                                               @215  NONAME
    div                                               @216  NONAME
    modf                                              @217  NONAME
    __vtt18ostream_withassign                         @218  NONAME
    ldiv                                              @220  NONAME
    exp                                               @221  NONAME
    init__12strstreambufFPciT1                        @222  NONAME
    __vft13strstreambase3ios_9strstream               @223  NONAME
    sync_with_stdio__3iosFv                           @224  NONAME
    _swprintf_ansi                                    @225  NONAME
    __nw__FP8SOMClassUiPCcT2                          @226  NONAME
    __tdump_allocated_delta                           @227  NONAME
    acos                                              @228  NONAME
    rand                                              @229  NONAME
    __udump_allocated_delta                           @231  NONAME
    tanh                                              @232  NONAME
    asin                                              @233  NONAME
    setbuf__9streambufFPciT2                          @234  NONAME
    _yn                                               @235  NONAME
    pow                                               @236  NONAME
    clog                                              @237  NONAME
    time                                              @238  NONAME
    underflow__9streambufFv                           @239  NONAME
    cerr                                              @240  NONAME
    fmod                                              @241  NONAME
    log10                                             @242  NONAME
    sinh                                              @243  NONAME
    getc                                              @244  NONAME
    exit                                              @245  NONAME
    __ct__12strstreambufFPciT1                        @246  NONAME
    atan2                                             @247  NONAME
    atof                                              @248  NONAME
    atoi                                              @249  NONAME
    gets                                              @250  NONAME
    atol                                              @251  NONAME
    cosh                                              @252  NONAME
    _erf                                              @253  NONAME
    _IEEE_LDBL_SIGN_NEG_MASK                          @254  NONAME
    cout                                              @255  NONAME
    _EXE_Exception                                    @256  NONAME
    _dup                                              @257  NONAME
    sqrt                                              @258  NONAME
    scanf                                             @259  NONAME
    putc                                              @260  NONAME
    puts                                              @261  NONAME
    _ProfileThrow32                                   @263  NONAME
    _cabs                                             @264  NONAME
    ldexp                                             @266  NONAME
    srand                                             @268  NONAME
    raise                                             @269  NONAME
    _IEEE_DBL_SIGN_NEG_MASK                           @270  NONAME
    mblen                                             @272  NONAME
    _ecvt                                             @274  NONAME
    set_new_handler__FPFv_v                           @275  NONAME
    _dup2                                             @276  NONAME
    _fcvt                                             @277  NONAME
    _gcvt                                             @278  NONAME
    frexp                                             @279  NONAME
    ctime                                             @280  NONAME
    _read                                             @281  NONAME
    stdin                                             @282  NONAME
    abort                                             @283  NONAME
    __vft7istream3ios_9strstream8iostream             @284  NONAME
    clock                                             @285  NONAME
    iconv                                             @286  NONAME
    _wait                                             @287  NONAME
    inf_special_in__7istreamFP9streambuf              @288  NONAME
    _tell                                             @289  NONAME
    getwc                                             @290  NONAME
    __ct__7istreamFP9streambufiP7ostream              @291  NONAME
    floor                                             @292  NONAME
    __vft7ostream3ios_9strstream8iostream             @294  NONAME
    wctob                                             @295  NONAME
    _erfc                                             @296  NONAME
    nan_special_in__7istreamFP9streambuf              @297  NONAME
    __fac                                             @298  NONAME
    _csid                                             @299  NONAME
    overflow__12strstreambufFi                        @300  NONAME
    __eof                                             @301  NONAME
    __ct__7istreamFP9streambuf                        @302  NONAME
    __ct__7ostreamFP9streambuf                        @303  NONAME
    wchar_out__7ostreamFiPcT1                         @304  NONAME
    _itoa                                             @306  NONAME
    _IEEE_LDBL_ALL_EXP_MASK                           @307  NONAME
    _open                                             @308  NONAME
    _ltoa                                             @309  NONAME
    qsort                                             @310  NONAME
    __as__18istream_withassignFR7istream              @312  NONAME
    putwc                                             @313  NONAME
    get__7istreamFR9streambufc                        @314  NONAME
    _exit                                             @315  NONAME
    _swab                                             @316  NONAME
    seekoff__9streambufFlQ2_3ios8seek_diri            @317  NONAME
    __ls__7ostreamFP9streambuf                        @318  NONAME
    __vtt19iostream_withassign                        @319  NONAME
    __as__18ostream_withassignFR7ostream              @320  NONAME
    _stat                                             @321  NONAME
    __as__3iosFR3ios                                  @322  NONAME
    __ct__3iosFR3ios                                  @323  NONAME
    __ct__7filebufFi                                  @324  NONAME
    __rs__7istreamFP9streambuf                        @325  NONAME
    __ct__7filebufFv                                  @326  NONAME
    __dt__7filebufFv                                  @327  NONAME
    sync__7filebufFv                                  @328  NONAME
    _ProfileUnwind32                                  @329  NONAME
    seekoff__8stdiobufFlQ2_3ios8seek_diri             @330  NONAME
    uresize__3iosFi                                   @331  NONAME
    _ilog2                                            @332  NONAME
    bitalloc__3iosFv                                  @333  NONAME
    setbuf__12strstreambufFPci                        @334  NONAME
    __ct__7fstreamFi                                  @335  NONAME
    __ct__7ostreamFi                                  @336  NONAME
    _gamma                                            @337  NONAME
    __ct__7fstreamFv                                  @338  NONAME
    __ct__7istreamFv                                  @339  NONAME
    __dt__7fstreamFv                                  @340  NONAME
    __ct__7ostreamFv                                  @341  NONAME
    __dt__7istreamFv                                  @342  NONAME
    __dt__7ostreamFv                                  @344  NONAME
    _set_mt_terminate__FPFv_v                         @345  NONAME
    fscanf                                            @347  NONAME
    __vtt10istrstream                                 @348  NONAME
    __ct__13strstreambaseFPciT1                       @349  NONAME
    __vtt10ostrstream                                 @350  NONAME
    _getch                                            @352  NONAME
    sscanf                                            @353  NONAME
    signal                                            @355  NONAME
    _chmod                                            @356  NONAME
    _dump_allocated                                   @357  NONAME
    __vft9streambuf                                   @358  NONAME
    _debug_trealloc                                   @359  NONAME
    __ls__7ostreamFd                                  @360  NONAME
    __ls__7ostreamFf                                  @361  NONAME
    __ls__7ostreamFi                                  @362  NONAME
    _lfind                                            @363  NONAME
    ungetc                                            @364  NONAME
    __ls__7ostreamFl                                  @365  NONAME
    ls_complicated__7ostreamFc                        @366  NONAME
    rename                                            @367  NONAME
    __ls__7ostreamFr                                  @368  NONAME
    __ls__7ostreamFw                                  @371  NONAME
    _kbhit                                            @372  NONAME
    cclass                                            @373  NONAME
    _wcsid                                            @374  NONAME
    _chdir                                            @375  NONAME
    _tfree                                            @376  NONAME
    remove                                            @377  NONAME
    memchr                                            @378  NONAME
    get__7istreamFRw                                  @379  NONAME
    _close                                            @380  NONAME
    memcmp                                            @381  NONAME
    atexit                                            @382  NONAME
    xget__7istreamFPc                                 @383  NONAME
    endl__FR7ostream                                  @384  NONAME
    _mheap                                            @385  NONAME
    _cgets                                            @386  NONAME
    _MemoryFileUsed                                   @387  NONAME
    _debug_theapmin                                   @388  NONAME
    ends__FR7ostream                                  @389  NONAME
    printf                                            @390  NONAME
    _debug_uheapmin                                   @391  NONAME
    mbrlen                                            @392  NONAME
    memset                                            @393  NONAME
    stderr                                            @394  NONAME
    wctomb                                            @395  NONAME
    mbtowc                                            @396  NONAME
    __nw__FP8SOMClassUiPCcT2Pv                        @397  NONAME
    adjustfield__3ios                                 @398  NONAME
    _Flush                                            @399  NONAME
    wcstod                                            @400  NONAME
    gmtime                                            @401  NONAME
    _atold                                            @402  NONAME
    mktime                                            @403  NONAME
    memcpy                                            @404  NONAME
    __vft7fstream3ios                                 @405  NONAME
    setbuf                                            @406  NONAME
    stdout                                            @407  NONAME
    wcslen                                            @408  NONAME
;;    tmpnam                                            @409  NONAME
    rewind                                            @410  NONAME
    wctype                                            @411  NONAME
    wcscat                                            @412  NONAME
    _mkdir                                            @413  NONAME
    _ultoa                                            @415  NONAME
    __vft7istream3ios_19iostream_withassign8iostream  @416  NONAME
    _ftime                                            @417  NONAME
    wcschr                                            @418  NONAME
    __dt__8stdiobufFv                                 @419  NONAME
    wcscmp                                            @420  NONAME
    wcstok                                            @421  NONAME
    _creat                                            @422  NONAME
    wcstol                                            @423  NONAME
    __vft7istream3ios                                 @424  NONAME
    _ctype                                            @425  NONAME
    wcswcs                                            @426  NONAME
    getenv                                            @427  NONAME
    perror                                            @428  NONAME
    wcsspn                                            @429  NONAME
    sync__8stdiobufFv                                 @431  NONAME
    setjmp                                            @432  NONAME
    _Fmprs                                            @433  NONAME
    _lseek                                            @434  NONAME
    _Fnprs                                            @436  NONAME
    strtod                                            @437  NONAME
    _rmdir                                            @438  NONAME
    _errno                                            @439  NONAME
    _umask                                            @440  NONAME
    _execl                                            @441  NONAME
    _cputs                                            @442  NONAME
    _sopen                                            @443  NONAME
    _fstat                                            @444  NONAME
    strlen                                            @445  NONAME
    wcsstr                                            @446  NONAME
    wcscpy                                            @448  NONAME
    __vft7ostream3ios_19iostream_withassign8iostream  @449  NONAME
    strcat                                            @450  NONAME
    _msize                                            @451  NONAME
    _rmtmp                                            @452  NONAME
    _uopen                                            @453  NONAME
    setiosflags__Fl                                   @454  NONAME
    _putch                                            @455  NONAME
    strchr                                            @456  NONAME
    strcmp                                            @457  NONAME
    strtok                                            @458  NONAME
    stdstatus__13Iostream_init                        @459  NONAME
    _cwait                                            @460  NONAME
    __vft7ostream3ios                                 @461  NONAME
    strtol                                            @462  NONAME
    _utime                                            @463  NONAME
    __ct__8ifstreamFi                                 @464  NONAME
    dbp__9streambufFv                                 @465  NONAME
    _write                                            @466  NONAME
    _upool                                            @467  NONAME
    strspn                                            @468  NONAME
    __ct__8ofstreamFi                                 @469  NONAME
    strset                                            @470  NONAME
    system                                            @471  NONAME
    _execv                                            @473  NONAME
    strrev                                            @474  NONAME
    initcount__13Iostream_init                        @475  NONAME
    floatfield__3ios                                  @476  NONAME
    __ct__12strstreambufFPSciT1                       @477  NONAME
    strupr                                            @479  NONAME
    __ct__8ifstreamFv                                 @480  NONAME
    _set_mt_unexpected__FPFv_v                        @481  NONAME
    basefield__3ios                                   @482  NONAME
    strlwr                                            @483  NONAME
    strstr                                            @484  NONAME
    __ct__8ofstreamFv                                 @485  NONAME
    strcpy                                            @486  NONAME
    __dt__8ifstreamFv                                 @487  NONAME
    __ct__12strstreambufFPUciT1                       @488  NONAME
    __dt__8ofstreamFv                                 @489  NONAME
    __vtt9strstream                                   @490  NONAME
    __ct__8iostreamFv                                 @491  NONAME
    __vft7istream3ios_18istream_withassign            @492  NONAME
    __dt__8iostreamFv                                 @493  NONAME
    __get_frame_ptr                                   @494  NONAME
    _hypot                                            @495  NONAME
    stdioflush__3ios                                  @496  NONAME
    setprecision__Fi                                  @497  NONAME
    __ls__7ostreamFUi                                 @498  NONAME
    __setup_embedded                                  @499  NONAME
    __ls__7ostreamFUl                                 @500  NONAME
    __vft7istream3ios_8ifstream                       @501  NONAME
    __rs__7istreamFPc                                 @502  NONAME
    _tzset                                            @503  NONAME
    _critlib_except                                   @504  NONAME
    __rs__7istreamFRd                                 @505  NONAME
    __rs__7istreamFRf                                 @506  NONAME
    __vft7ostream3ios_18ostream_withassign            @507  NONAME
    __vft7istream3ios_8iostream                       @508  NONAME
    __rs__7istreamFRi                                 @509  NONAME
    __rs__7istreamFRl                                 @510  NONAME
    __vft11fstreambase                                @511  NONAME
    __EDCThunkProlog                                  @512  NONAME
    _is_fd_open__Fi                                   @513  NONAME
    _ipmd_heap_check                                  @514  NONAME
    __rs__7istreamFRr                                 @515  NONAME
    __rs__7istreamFRs                                 @516  NONAME
    __vtt11fstreambase                                @517  NONAME
    __rs__7istreamFPw                                 @518  NONAME
    __rs__7istreamFRw                                 @519  NONAME
    __vft7ostream3ios_8ofstream                       @520  NONAME
    _tdump_allocated                                  @521  NONAME
    __set_frame_ptr                                   @522  NONAME
    _udump_allocated                                  @523  NONAME
    __vft7ostream3ios_8iostream                       @524  NONAME
    _LC_INFINITY_STR                                  @525  NONAME
    _ctype_upperidx                                   @526  NONAME
    _ctype_loweridx                                   @527  NONAME
    __dump_allocated                                  @528  NONAME
    __Invoke__Delete                                  @529  NONAME
    __ct__8iostreamFP9streambuf                       @530  NONAME
    read__7istreamFPci                                @531  NONAME
    __ct__7istreamFiT1P7ostream                       @532  NONAME
    __EDC3216                                         @533  NONAME
    _ctype_ctypeidx                                   @534  NONAME
    __deleteSomObject                                 @535  NONAME
    __vft8ifstream3ios                                @536  NONAME
    __ls__7ostreamFPFR3ios_R3ios                      @537  NONAME
    __vft8iostream3ios                                @538  NONAME
    _callback_opt_sys                                 @539  NONAME
    __as__18istream_withassignFP9streambuf            @540  NONAME
    __as__18ostream_withassignFP9streambuf            @541  NONAME
    openprot__7filebuf                                @542  NONAME
    str__9strstreamFv                                 @543  NONAME
    flush__FR7ostream                                 @544  NONAME
    __rs__7istreamFPFR3ios_R3ios                      @545  NONAME
    __vft8ofstream3ios                                @546  NONAME
    close__7filebufFv                                 @547  NONAME
    seekg__7istreamFl                                 @548  NONAME
    __ct__11stdiostreamFP6__file                      @549  NONAME
    _clear87                                          @550  NONAME
    seekp__7ostreamFl                                 @551  NONAME
    __ct__7ostreamFiPc                                @552  NONAME
    complicated_put__7ostreamFc                       @553  NONAME
    __vft12strstreambuf9streambuf                     @554  NONAME
    precision__3iosFi                                 @555  NONAME
    resetiosflags__Fl                                 @556  NONAME
    __tdump_allocated                                 @557  NONAME
    __vft8iostream3ios_7fstream                       @558  NONAME
    tellg__7istreamFv                                 @559  NONAME
    __udump_allocated                                 @560  NONAME
    __ls__7ostreamFPCc                                @561  NONAME
    get__7istreamFPcic                                @562  NONAME
    __ct__9streambufFv                                @563  NONAME
    __ct__9strstreamFv                                @564  NONAME
    __dt__9streambufFv                                @565  NONAME
    __dt__9strstreamFv                                @566  NONAME
    tellp__7ostreamFv                                 @567  NONAME
    sync__9streambufFv                                @568  NONAME
    get_complicated__7istreamFRc                      @569  NONAME
    doallocate__12strstreambufFv                      @570  NONAME
    __rs__7istreamFPSc                                @571  NONAME
    __ls__7ostreamFPCv                                @572  NONAME
    __rs__7istreamFPUc                                @573  NONAME
    __ls__7ostreamFPCw                                @574  NONAME
    flush__7ostreamFv                                 @575  NONAME
    __vec__new__som                                   @576  NONAME
    __vft18istream_withassign3ios                     @577  NONAME
    __rs__7istreamFRUi                                @578  NONAME
    __vft18ostream_withassign3ios                     @579  NONAME
    __rs__7istreamFRUl                                @580  NONAME
    __ct__18istream_withassignFv                      @581  NONAME
    __dt__18istream_withassignFv                      @582  NONAME
    isalpha                                           @584  NONAME
    __ct__18ostream_withassignFv                      @585  NONAME
    __rs__7istreamFRUs                                @586  NONAME
    __dt__18ostream_withassignFv                      @587  NONAME
    regexec                                           @588  NONAME
    regfree                                           @589  NONAME
    _ddused                                           @590  NONAME
    _eh_add                                           @591  NONAME
    _getche                                           @592  NONAME
    asctime                                           @593  NONAME
    __vec__copy__som                                  @594  NONAME
    bsearch                                           @595  NONAME
    __compute_embedded                                @596  NONAME
    _getpid                                           @597  NONAME
    isblank                                           @598  NONAME
    _getcwd                                           @599  NONAME
    rs_complicated__7istreamFRc                       @600  NONAME
    __dl__FP9SOMObject                                @601  NONAME
    __ct__19iostream_withassignFv                     @602  NONAME
    detach__7filebufFv                                @603  NONAME
    attach__7filebufFi                                @604  NONAME
    get_complicated__7istreamFRSc                     @606  NONAME
    isgraph                                           @607  NONAME
    __dt__19iostream_withassignFv                     @608  NONAME
    get_complicated__7istreamFRUc                     @609  NONAME
    _eh_del                                           @610  NONAME
    ls_complicated__7ostreamFSc                       @611  NONAME
    ls_complicated__7ostreamFUc                       @613  NONAME
    ungetwc                                           @614  NONAME
    isspace                                           @615  NONAME
    _chsize                                           @616  NONAME
    wcrtomb                                           @617  NONAME
    memmove                                           @618  NONAME
    __vec__new__place                                 @619  NONAME
    gcount__7istreamFv                                @620  NONAME
    regcomp                                           @621  NONAME
    _uclose                                           @622  NONAME
    isalnum                                           @623  NONAME
    _access                                           @624  NONAME
    tmpfile                                           @625  NONAME
    _IEEE_DBL_INF_MASK                                @626  NONAME
    _cscanf                                           @627  NONAME
    iscntrl                                           @628  NONAME
    mbrtowc                                           @629  NONAME
    memicmp                                           @631  NONAME
    isdigit                                           @632  NONAME
    seekoff__12strstreambufFlQ2_3ios8seek_diri        @633  NONAME
    catopen                                           @634  NONAME
    _heapchk                                          @635  NONAME
    _fileno                                           @636  NONAME
    getchar                                           @637  NONAME
    _MAKE_DBL_POSITIVE                                @638  NONAME
    __vft19iostream_withassign3ios                    @639  NONAME
    _uaddmem                                          @640  NONAME
    dec__Fli                                          @641  NONAME
    _execle                                           @642  NONAME
    _osmode                                           @643  NONAME
    setvbuf                                           @644  NONAME
    getwchar                                          @645  NONAME
    difftime                                          @646  NONAME
    wcscoll                                           @648  NONAME
    _uflush                                           @649  NONAME
    wcspbrk                                           @650  NONAME
    strtold                                           @651  NONAME
    _FreeFCB                                          @653  NONAME
    wcsncat                                           @654  NONAME
    __vft8iostream3ios_9strstream                     @655  NONAME
    maxcoll                                           @656  NONAME
    _heapset                                          @657  NONAME
    _NAN_LEN                                          @658  NONAME
    _tempnam                                          @659  NONAME
    _heapmin                                          @660  NONAME
    wcwidth                                           @661  NONAME
    longjmp                                           @662  NONAME
    _InitFCB                                          @663  NONAME
    wcsrchr                                           @664  NONAME
    wcsncmp                                           @665  NONAME
    clearerr                                          @666  NONAME
    sprintf                                           @667  NONAME
    _execve                                           @668  NONAME
    islower                                           @669  NONAME
    vprintf                                           @670  NONAME
    _setmode                                          @671  NONAME
    mbsinit                                           @672  NONAME
    catgets                                           @673  NONAME
    tolower                                           @674  NONAME
    wcsxfrm                                           @675  NONAME
    memccpy                                           @676  NONAME
    __goscan                                          @677  NONAME
    strcmpi                                           @678  NONAME
    wcscspn                                           @679  NONAME
    _unlink                                           @680  NONAME
    __as__19iostream_withassignFP9streambuf           @681  NONAME
    underflow__12strstreambufFv                       @682  NONAME
    _matherr                                          @683  NONAME
    strcoll                                           @684  NONAME
    wcstoul                                           @685  NONAME
    strpbrk                                           @686  NONAME
    putchar                                           @687  NONAME
    ispunct                                           @688  NONAME
    __CurrentException                                @689  NONAME
    wcstombs                                          @690  NONAME
    strncat                                           @691  NONAME
    __vft7istream3ios_10istrstream                    @692  NONAME
    _getdcwd                                          @693  NONAME
    stricmp                                           @694  NONAME
    _tzname                                           @695  NONAME
    iswspace                                          @696  NONAME
    _tcalloc                                          @697  NONAME
    putwchar                                          @698  NONAME
    regerror                                          @699  NONAME
    _execlp                                           @700  NONAME
    _fltused                                          @701  NONAME
    strrchr                                           @702  NONAME
    strncmp                                           @703  NONAME
    _ucreate                                          @705  NONAME
    _spawnl                                           @706  NONAME
    __getche                                          @707  NONAME
    strfmon                                           @708  NONAME
    mbstowcs                                          @709  NONAME
    _lsearch                                          @710  NONAME
    strxfrm                                           @711  NONAME
    isupper                                           @712  NONAME
    isprint                                           @713  NONAME
    _fpreset                                          @714  NONAME
    _INF_LEN                                          @715  NONAME
    strcspn                                           @716  NONAME
    _assert                                           @717  NONAME
    toupper                                           @718  NONAME
    _onexit                                           @719  NONAME
    _ungetch                                          @720  NONAME
    _rpmatch                                          @721  NONAME
    _fpninit                                          @722  NONAME
    _chdrive                                          @723  NONAME
    strtoul                                           @724  NONAME
    strnset                                           @725  NONAME
    wcsncpy                                           @726  NONAME
    __wDestructSOMBase                                @727  NONAME
    wcsftime                                          @728  NONAME
    __cputs                                           @729  NONAME
    _execvp                                           @730  NONAME
    catclose                                          @731  NONAME
    _loadmod                                          @732  NONAME
    __vft7ostream3ios_10ostrstream                    @733  NONAME
    rs_complicated__7istreamFRSc                      @734  NONAME
    iswdigit                                          @735  NONAME
    _freemod                                          @736  NONAME
    oct__Fli                                          @737  NONAME
    strnicmp                                          @738  NONAME
    isxdigit                                          @739  NONAME
    iswblank                                          @740  NONAME
    iswalpha                                          @741  NONAME
    rs_complicated__7istreamFRUc                      @742  NONAME
    wcswidth                                          @743  NONAME
    iswpunct                                          @744  NONAME
    _environ                                          @745  NONAME
    _InitBuf                                          @746  NONAME
    _tmalloc                                          @747  NONAME
    _makepath                                         @748  NONAME
    _spawnv                                           @750  NONAME
    hex__Fli                                          @752  NONAME
    iswupper                                          @753  NONAME
    strftime                                          @754  NONAME
    _ustats                                           @756  NONAME
    _NAN_STR                                          @757  NONAME
    towupper                                          @758  NONAME
    _putenv                                           @759  NONAME
    _cprintf                                          @760  NONAME
    iswgraph                                          @761  NONAME
    strptime                                          @762  NONAME
    _execlpe                                          @763  NONAME
    _osmajor                                          @764  NONAME
    _daylight                                         @765  NONAME
    iswlower                                          @766  NONAME
    _spawnle                                          @767  NONAME
    __dofmto                                          @768  NONAME
    _isatty                                           @769  NONAME
    towlower                                          @770  NONAME
    _spawnlp                                          @771  NONAME
    setw__Fi                                          @772  NONAME
    _exception_dllinit                                @773  NONAME
    chr__FiT1                                         @774  NONAME
    _fgetchar                                         @775  NONAME
    _strdate                                          @776  NONAME
    setlocale                                         @777  NONAME
    iswprint                                          @778  NONAME
    _osminor                                          @779  NONAME
    _strtime                                          @780  NONAME
    localtime                                         @781  NONAME
    getsyntx                                          @782  NONAME
    _execvpe                                          @783  NONAME
    vsprintf                                          @784  NONAME
    _flushall                                         @785  NONAME
    strerror                                          @786  NONAME
    _getdrive                                         @787  NONAME
    _uheapchk                                         @788  NONAME
    _INF_STR                                          @789  NONAME
    __SOMEnv                                          @790  NONAME
    collrange                                         @791  NONAME
    __Throw                                           @792  NONAME
    _atofieee                                         @793  NONAME
    iswalnum                                          @794  NONAME
    _reg_heap                                         @795  NONAME
    collorder                                         @796  NONAME
    iswcntrl                                          @797  NONAME
    __vft3ios                                         @798  NONAME
    _spawnve                                          @799  NONAME
    iswctype                                          @800  NONAME
    _spawnvp                                          @801  NONAME
    _floatfmt                                         @802  NONAME
    getmccoll                                         @803  NONAME
    _fputchar                                         @804  NONAME
    _fullpath                                         @805  NONAME
    _setupenv                                         @806  NONAME
    str__10ostrstreamFv                               @807  NONAME
    _theapmin                                         @808  NONAME
    _udefault                                         @809  NONAME
    _uheapmin                                         @810  NONAME
    _set_mt_new_handler__FPFv_v                       @811  NONAME
    ccsidtocs                                         @812  NONAME
    _infinity                                         @813  NONAME
    _fposinfi                                         @814  NONAME
    cstoccsid                                         @815  NONAME
    __vft13strstreambase                              @816  NONAME
    iswxdigit                                         @817  NONAME
    _status87                                         @818  NONAME
    _trealloc                                         @819  NONAME
    __vtt13strstreambase                              @820  NONAME
    _CRT_term                                         @821  NONAME
    _dposqnan                                         @822  NONAME
    wcsrtombs                                         @823  NONAME
    collequiv                                         @824  NONAME
    _fposqnan                                         @825  NONAME
    _uheapset                                         @826  NONAME
    strtocoll                                         @827  NONAME
    colltostr                                         @828  NONAME
    _timezone                                         @829  NONAME
    __vft10istrstream3ios                             @830  NONAME
    _spawnlpe                                         @831  NONAME
    __vft10ostrstream3ios                             @832  NONAME
    _CRT_init                                         @833  NONAME
    open__7filebufFPCciT2                             @834  NONAME
    _udestroy                                         @835  NONAME
    overflow__7filebufFi                              @836  NONAME
    __vft8iostream3ios_19iostream_withassign          @837  NONAME
    _fullDump                                         @838  NONAME
    __ct__7filebufFiPcT1                              @840  NONAME
    mbsrtowcs                                         @841  NONAME
    vswprintf                                         @842  NONAME
    _spawnvpe                                         @843  NONAME
    putback__7istreamFc                               @844  NONAME
    get__7istreamFPScic                               @845  NONAME
    get__7istreamFPUcic                               @846  NONAME
    __ungetch                                         @847  NONAME
    _strerror                                         @848  NONAME
    _control87                                        @849  NONAME
    str__12strstreambufFv                             @851  NONAME
    __ls__7ostreamFPCSc                               @852  NONAME
    __ReThrow                                         @853  NONAME
    tie__3iosFP7ostream                               @854  NONAME
    __ls__7ostreamFPCUc                               @855  NONAME
    __vft11fstreambase3ios                            @856  NONAME
    __ct__9streambufFPci                              @857  NONAME
    open__7fstreamFPCciT2                             @858  NONAME
    __ct__7fstreamFiPcT1                              @859  NONAME
    __ct__7istreamFiPcT1                              @860  NONAME
    last_op__7filebufFv                               @861  NONAME
    localeconv                                        @862  NONAME
    __vft11stdiostream3ios                            @863  NONAME
    __dt__10istrstreamFv                              @864  NONAME
    _scanfieee                                        @865  NONAME
    __ct__10ostrstreamFv                              @866  NONAME
    eatwhite__7istreamFv                              @867  NONAME
    __dt__10ostrstreamFv                              @868  NONAME
    _fcloseall                                        @869  NONAME
    __ct__7fstreamFPCciT2                             @870  NONAME
    getwmccoll                                        @871  NONAME
    __ct__11fstreambaseFi                             @872  NONAME
    __ct__8ifstreamFiPcT1                             @873  NONAME
    __ct__8ofstreamFiPcT1                             @874  NONAME
    __vft11fstreambase3ios_7fstream                   @875  NONAME
    __vft11fstreambase3ios_8ifstream                  @876  NONAME
    __ct__11fstreambaseFv                             @877  NONAME
    _ldposinfi                                        @878  NONAME
    __dt__11fstreambaseFv                             @879  NONAME
    __vft11fstreambase3ios_8ofstream                  @880  NONAME
    _searchenv                                        @881  NONAME
    overflow__8stdiobufFi                             @882  NONAME
    do_ipfx__7istreamFi                               @883  NONAME
    ismccollel                                        @884  NONAME
    _terminate                                        @885  NONAME
    _endthread                                        @886  NONAME
    _GetErrMsg                                        @887  NONAME
    __threadid                                        @888  NONAME
    __dt__11stdiostreamFv                             @889  NONAME
    _ldposqnan                                        @890  NONAME
    _set_crt_msg_handle                               @891  NONAME
    _fopenused                                        @892  NONAME
    __ct__10istrstreamFPc                             @893  NONAME
    eatwhite__FR7istream                              @894  NONAME
    ignore__7istreamFiT1                              @895  NONAME
    iconv_open                                        @896  NONAME
    __nw__FP8SOMClassUi                               @897  NONAME
    __doserrno                                        @898  NONAME
    _heap_walk                                        @899  NONAME
    _LHUGE_VAL                                        @900  NONAME
    setbuf__7filebufFPci                              @901  NONAME
    str__FPCci                                        @902  NONAME
    _cputsused                                        @903  NONAME
    __PureVirtualCalled                               @904  NONAME
    __cppstore                                        @905  NONAME
    _Lib_excpt                                        @906  NONAME
    _splitpath                                        @907  NONAME
    __vft9strstream3ios                               @908  NONAME
    open__8ifstreamFPCciT2                            @909  NONAME
    do_opfx__7ostreamFv                               @910  NONAME
    open__8ofstreamFPCciT2                            @911  NONAME
    _MAKE_LDBL_POSITIVE                               @912  NONAME
    do_osfx__7ostreamFv                               @913  NONAME
    _Exception                                        @914  NONAME
;SvL: These shouldn't be here. Must be local for each dll or exe or
;     else static/global objects don't get initialized
;    __ctordtorInit                                    @915
;    __ctordtorTerm                                    @916
    _Exception_CPP                                    @917  NONAME
;    __ctdtused                                        @918

    __modi64                                           @1027 NONAME
    __modu64                                           @1028 NONAME
    __multi64                                          @1029 NONAME
    __u64toflt                                         @1030 NONAME
    __divi64                                           @1031 NONAME
    __divu64                                           @1032 NONAME

    _DosDeleteCriticalSection@4                        @1200 NONAME
    _DosEnterCriticalSection@8                         @1201 NONAME
    _DosInitializeCriticalSection@12                   @1202 NONAME
    _DosAccessCriticalSection@8                        @1203 NONAME
    _DosLeaveCriticalSection@4                         @1204 NONAME
    _DosInterlockedCompareExchange@12                  @1205 NONAME
    _DosInterlockedDecrement@4                         @1206 NONAME
    _DosInterlockedExchange@8                          @1207 NONAME
    _DosInterlockedExchangeAdd@8                       @1208 NONAME
    _DosInterlockedIncrement@4                         @1209 NONAME
    _DosValidateCriticalSection@4                      @1210 NONAME

    _DosQueryModuleHandleStrict@8                      @2000 NONAME
