
;
; irmon.def:
;       module definition file for IRMON.DLL, an XCenter
;       plug-in widget DLL.
;
;       Copyright (C) 2001 Markus Montkowski.
;       This file is part of the XWorkplace source package.
;       XWorkplace is free software; you can redistribute it and/or modify
;       it under the terms of the GNU General Public License as published
;       by the Free Software Foundation, in version 2 as it comes in the
;       "COPYING" file of the XWorkplace main distribution.
;       This program is distributed in the hope that it will be useful,
;       but WITHOUT ANY WARRANTY; without even the implied warranty of
;       MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;       GNU General Public License for more details.
;

LIBRARY IRMON INITINSTANCE TERMINSTANCE
Description '@#Netlabs:0.7.4#@ IR Monitor plugin DLL'
PROTMODE

DATA              MULTIPLE READWRITE LOADONCALL NONSHARED
;       doesn't really matter, because the widget is only ever used
;       in the WPS process; we use MULTIPLE NONSHARED here to reduce
;       the amount of shared memory that is needed for the DLL

CODE              LOADONCALL

EXPORTS
    WgtInitModule      @1
    WgtUnInitModule    @2
    WgtQueryVersion    @3


