
;
; rmenu.def:
;       module definition file for RMENU.DLL, an XCenter
;       plug-in widget DLL.
;
;       Copyright (C) 2001 Martin Lafaix.
;       This file is part of the XWorkplace Widget Library source package.
;       XWorkplace is free software; you can redistribute it and/or modify
;       it under the terms of the GNU General Public License as published
;       by the Free Software Foundation, in version 2 as it comes in the
;       "COPYING" file of the XWorkplace main distribution.
;       This program is distributed in the hope that it will be useful,
;       but WITHOUT ANY WARRANTY; without even the implied warranty of
;       MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
;       GNU General Public License for more details.
;

LIBRARY RMENU INITINSTANCE TERMINSTANCE
Description '@#Netlabs:0.7.4#@ Rexx menu plugin DLL'
PROTMODE

DATA              SINGLE READWRITE LOADONCALL SHARED

CODE              LOADONCALL

EXPORTS
    RwgtInitModule          @1
    RwgtUnInitModule        @2
    RwgtQueryVersion        @3

    RwgtInitializeStem      @66
    RwgtExtractStem         @67

